1.75 1.8 1.85 1.9 1.95 2

)^2c

) (GeV/ π(K M 0.3 0.4 0.5 0.6 0.7 0.8 610 ×

)^2c Counts / (8 MeV/

ALICE

+π^- K

→ ^0D and charge conj. c < 2 GeV/ Tp 1 <

= 5.02 TeV NNs Pb, − 0-10% Pb 2c 2 MeV/ ± = 1868 μ_2 c = 12 MeV/ σ 1939 ± S = 14044

1.75 1.8 1.85 1.9 1.95 2

)^2c

) (GeV/ π(K M 2− 1− 0 1 2 3 4 5 6 310 ×

)^2c Counts - bkg fct. / (8 MeV/

+π^- K

→ ^0D and charge conj. c < 2 GeV/ Tp 1 < 2c 2 MeV/ ± = 1868 μ_2 c = 12 MeV/ σ 1939 ± S = 14044

1.75 1.8 1.85 1.9 1.95 2

)^2c

) (GeV/ ππ(K M 0.4 0.6 0.8 1 1.2 1.4 310 ×

)^2c Counts / (14 MeV/

+π^+π^- K

→ ^+D and charge conj. c < 10 GeV/ Tp 8 < 2c 1 MeV/ ± = 1871 μ_2 c 1 MeV/ ± = 17 σ 89 ± S = 1158

0.14 0.142 0.144 0.146 0.148 0.15 0.152 0.154

)^2c

) (GeV/ π(K M ) - ππ(K M 0 10 20 30 40 50 60 70

)^2c

Counts / (0.8 MeV/

+π^+π^- K

→ ^+π^0 D

→ ^{*+}D and charge conj. c < 36 GeV/ Tp 24 < 2c 0.2 MeV/ ± = 145.6 μ_2 c 0.2 MeV/ ± = 0.9 σ 17 ± S = 73

1.8 1.85 1.9 1.95 2 2.05 2.1 2.15

)^2c

) (GeV/ π (KK M 100 150 200 250 300 350

)^2c Counts / (10 MeV/

+π^+K^- K

→ ^+πϕ→ _s^+D and charge conj. c < 6 GeV/ Tp 4 < 2c 3 MeV/ ± = 1968 μ_2 c 2 MeV/ ± = 11 σ 34 ± S = 161

+D^+_sD

1.8 1.85 1.9 1.95 2 2.05 2.1 2.15

)^2c

) (GeV/ π (KK M 0 5 10 15 20 25 30

)^2c

Counts / (14 MeV/

+π^+K^- K

→ ^+πϕ→ _s^+D and charge conj. c < 16 GeV/ Tp 12 < 2c 3 MeV/ ± = 1969 μ_2 c 3 MeV/ ± = 17 σ 9± S = 44

+D + sD